2 4 6 8 10 12 )c (GeV/ Tp 6 10 20 30 40 210 210 ×2 210 ×3

310 310 ×2 310 ×3

410

)c ^{-1} b GeV μ) ( yd_Tp/(d σ^2d

ALICE_{= 5.02 TeV}

NNs, ^0_cΞ

Prompt

Lumi. unc. (not shown):

BR unc. (not shown):

3.7% ± Pb: −p 2.1% ± pp: 1.6% ± = 13 TeV: s pp scaled from

22% ± = 13 TeV: s Pb, pp scaled from −p 28.4% ± pp:

< 0.04 cms y 0.96 < − Pb, −p | < 0.5 y pp, |

× ^{Pb}A | < 0.5 y = 13 TeV, | s pp scaled from

× ^{Pb}A

ALI-PUB-571003

ALI-PUB-571003